ICD-G0006

Telescope Mass Properties

M. Warner

November 11, 1993

Approved by Systems Engineer: _____________________

GEMINI PROJECT OFFICE 950 N. Cherry Ave. Tucson, Arizona 85719 Phone: (520) 318-8545 Fax: (520) 318-8590

ICD-G0006

Revision Control Descriptions

Revision:

Date:

Approved:

Description:

ICD-G0006 Page 2 of 3

This General Interface Document describes the telescope mass properties.

Mount Tube Mass, kg 170,000 (172,000)*

Ixx, kg-m^2 1.60E+6 2.98E+6 Iyy, kg-m^2 3.95E+6 3.51E+5 Izz, kg-m^2 4.20E+6 2.65E+6

Location of C.G.

(x, y, z) meters: (0, -0.25, -6.1) (0, 0, 0)

*Approximate: i.e., tube mass is controlled in ICD-G0001, -0002, and -0003.

ICD-G0006 Page 3 of 3